Muon IdentifiersEndcap 2Endcap 1Figure 1. Plan view showing both muon endcaps of the proposed upgradedPHENIX spectrometer. The first endcap (large triangle on the right) is theoriginal muon arm of the PHENIX conceptual design report. The secondendcap is shown on the left as a smaller triangle subtending the same angularrange, 10-35o. The muon identifiers of the two endcaps are the verticalblocks of lines at the extreme right and extreme left, representing steelabsorbers and muon chambers. Also shown at the top and bottom of thefigure are muon chambers and absorbers proposed for the central magnetarms. The central muon identifiers are located outside the concrete shieldingenclosure.