00 . 0 5 0 . 1 0 . 1 5 0 . 2 0 . 2 5 0 . 3 05 0 1 0 0 1 5 0

A c c e p t a n c e qd e c a y Figure 7. Decay angle acceptance of the upgraded muon spectrometer (2endcaps plus central arms) for Drell-Yan pairs with

τ ≥ 0.08.